<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">ƒ�You vow to get in shape!�From up here, you can see the Atlantic Ocean.�But, looking through the windows, all you can see is dental equipment and a lot of people wearing smocks!�A closed gymnastics studio is on the ground floor, while a dentist's office occupies the second floor.�It looks like there is no one inside the gymnastics studio, although the mini-blinds severely handicap your view.�You are unable to part the mini-blinds to see inside since blinds are commonly placed on the INSIDE of windows!�The door leading to the gymnastics studio is locked.�You try the door and find it is locked.�The "Gym-Dandy Gymnastics Center's" sign is made of virgin polyvinyl chloride.�Now would be an excellent time for you to save your game, Larry.�</pre></body></html>